%D See m-tikz.mkxl for comments.

\startmodule [pgfplotstable]

\writestatus{loading}{ConTeXt User Module / Pgfplotstable}

\usemodule[pgfplots]

\tikzinputfile{pgfplotstable.code.tex}%

\stopmodule


