% language=us runpath=texruns:manuals/ontarget

\startcomponent ontarget-green

\environment ontarget-style

\startchapter[title={Running green}]

There are a few contradicting developments going on: energy prices sky|-|rocket
and Intel and AMD are competing for the fastest \CPU's where saving energy seems
mostly related to making sure that the many cores running at the same time don't
burn the machine. However, \TEX\ is a single core consumer so throwing lots of
cores into the game is not helping much. You're better served with one very fast
core than many slower ones that accumulate to much horsepower. The later makes
sense when you process video or play games, but that's not what \TEX\ is about,
although it is fun to play with. Of course often multiple cores come in handy,
for instance in the build farm that is used to compile \LUAMETATEX\ and
intermediate \TEXLIVE\ releases: when that gets compiled and we also trigger a
\LUAMETATEX\ build, two times 10 \LINUX\ virtual machines are compiling and one
windows machine that runs four compile jobs at the same time.

The server that runs the farm is Dell 710 server with dual 5630 Xeon processors,
6 SAS drives each 2GB in (hardware) raid 10, 72 GB memory, redundant power
supplies and 6 network ports. It sits idle for most of the time and consumes
between 250 and 400W. It is part of a redundant setup: dual switches, dual
routers, multiple UPS's, air conditioning, two backup QNAP NAS's, a few low power
machines for distributed continuous incremental backups, etc. The server itself
is a refurbished one, so not the most expensive, but with the Dutch energy prices
of 2022 bound to gas prices, we quickly realized that there was no way we could
keep it up and running. Because we have three such servers (one is turned off and
used as fallback) we started wondering if we could go for a different solution.

As we recently upgraded the 2013 laptops to refurbished 2018 ones (the latest
models that could use the docking stations that we have), we decided to buy a few
more and test these as replacements for the servers. Of course one has to pimp
these machines a bit: a professional 2TB nvme SSD plus a proper 2.5in SSD as
backup one, 64 GB of memory, a few extra USB3 network cards. The \CPU's are fast
mobile Xeons. We use proxmox as virtual host and that runs fine in such a
configuration.

Surprisingly, after moving the farm to that setup, which basically boils down to
moving virtual machines, we found that running those parallel compilations
performance wise was quite okay. And the nice thing was that these machines idle
much lower, some 20--30W. The saving is therefore quite noticeable and we decided
to check some more; after all it would be nice if we could bring down the average
power consumption of 1750W down to at least half so that it would match the
output of a few solar panels. Of course it means that one has to ditch perfectly
well working machines which itself is not that environmental friendly but there
is not much to choose here.

The second machine to be replaced was the one that runs quite some virtual
machines too: the main file server, the mail server, an ftp server, the website, an
rsync host, the squeezebox server that also serves as update test, and various
project related rendering services. All run in their own (OpenSuse) virtual
machine. After installing a similar laptop those were also moved.

As a side effect, the two backup NAS's were replaced by a single laptop (my 2013
Dell precision workhorse) running one backup file server, and for an extra
incremental backup (rsnaphot running hourly, daily, weekly and monthly backups is
our friend) a 2013 macbook was turned into a \LINUX\ machine (15W idle with an
internal reused SSD\footnote {For a change that apple machine was easy to update,
and we could even get a new clone battery replacement.} and an external 4GB
disk), two managed switches became one (after all we had less network cables due
to lost redundancy), only one backup power supply (that will be replaced by an
nicer alternative when it breaks down; after all, by using laptops we get power
backup for free). The total consumption went down with at least 1000W. Of course
there is an investment involved and we need to reconfigure the server rack, but
the expectation is that by investing now we get less troubles later (less
gambling on energy). \footnote {We hope to save some 9000 kWh which means that
save at least some 2500\euro\ per year and more when the government will
reinstate its energy tax policy and or prices go further up, which seems to be
the case. Even before the crisis in the Netherlands 5ct/Kwh became fives times
that amount effectively when connection, transportation, energy tax and value
added tax gets added.}

But, there is still the pending question of what the impact is on the services
that we run. The most demanding ones are the Math4all and Math4mbo: these produce
large files, need many resources (\XML\ and images), and we didn't want to burn
ourselves too much. Now, here is an interesting observation: this service runs
twice as fast on the new infrastructure. But it is hard to explain why. The file
server is on a different machine (so no fast internal network), the \CPU\ is a
bit faster but not that much, the virtual machine is on \SSD, but files are saved
on the file server, which is a two disk \USB3 enclosure connected directly to a
virtual machine that does software raid. The most important difference is that
main memory is much faster and \TEX\ is a memory intense process. From when we
started with \LUATEX\ we do know that memory bandwidth and \CPU\ caches makes a
difference. Maybe the faster floating point handling fo the more modern Xeon also
helps here.

And that brings me to the following: how do we actually benchmark \TEX ? When you
go on the internet and compare \CPU's most tests are not that comparable to a
\TEX\ run on a single core. One can think of a set of test files, but the problem
there is that when the engine evolves and details in the macro package coding
changes, one looses the comparison with older tests. This is why, when we do such
tests, we always run the same test on the different platforms. Although this
often shows that the gain on newer hardware is seldom what one expects from the
more general benchmarks, one can still be surprised. When we moved to five year
newer laptops the gain was some 30\% for me and 50\% for my colleague. The
difference between his laptop and the slightly more beefed up virtual machine can
be neglected.

We monitor the power consumption with a youless device connected to the power
meter. When I process the \LUAMETATEX\ manual I see the phase that the machine
sits on go up 20W for a run that takes some 9 seconds. Let's say that we use
180Ws or 0.0006kWh (20.000 runs per kWh). So, compared to the idle power usage of
a server, a single \TEX\ run can be neglected, simply because it is so fast. So,
what is actually the most efficient hardware for a \TEX\ service? I get the
feeling that a decent Intel Atom C3955 16-Core driven machine is quite okay for
that, but I don't have that at hand and last time I checked one could not order
anything anyway. And with prices of hardware going up it's also not something you
try for fun. As comparison to what we have now, testing \TEX\ on an Intel
NUC11ATKC2 could also be interesting (it has an N4505 \CPU). There was a time
when I considered a bunch of raspberry pi's but they no longer are that cheap,
given that you can get them, and adding a case and proper disc enclosure also
adds up. When wrapped in a nice package the pi will probably a couple of times
slower but it then probably also uses less power. These fitlets are also
interesting but again, one can't get them.

It is kind of fun to play with optimizations that don't really impact the clarity
of the code. One can argue that spending a day on something that saves 0.005
seconds on a specific run is a waste of time, but of course one has to multiply
that number by a number of runs. Personally I will never gain from it but
nevertheless it can save some energy: imagine a batch of 15000 documents every
day. We then save $15000 * 0.005 * 365 = 27375$ seconds or about 8 hours runtime.
This can still be neglected but what if this is not the only optimization?

An example of such an optimization is this:

\starttyping
\advance\somecounter    \plusone
\advance\somecounter by \plusone
\stoptyping

The second one runs faster because there is no push back involved as side effect of
the lack of a keyword, so how about adding this to the engine?

\starttyping
\advanceby   \somecounter \plusone
\advancebyone\somecounter
\stoptyping

Given the way \LUAMETATEX\ is coded, it only needs a few lines! In this case it
extends the repertoire of primitives so it is visible but we have many other
(similarly small) optimizations that contribute. Again, the average user will not
notice a drop in runtime from 1.5 seconds to 1.45 but when 8 hours become 80
hours or 800 hours it does become interesting. In energy sensitive 2022 these 800
hours not only save some \texteuro 400 but also contribute to a lower carbon
footprint! And now imagine how much could be saved on these extensive runs when
we make sure that the style used is optimal? Of course, when we need two runs per
document it starts adding up more.

Some experiments with a demanding file showed one percent gain (on a 2.7 seconds
run) using the alternative integers, dimensions and advance primitives. However,
using \CONTEXT's compact font mode brought down runtime to 2.0 seconds! So, in
the end it's all very relative. It is worth noticing that the .7 seconds saved on
fonts is sort of constant, which means that accumulated gains elsewhere makes
that .7 seconds more significant as we progress.

\stopchapter

% 4 * 7520 precision with Xeons
% 1 * 7600 precision with extreme i7
% 1 * 2200W dell ups
% 2 * 4K monitor (+ 3 monitors turned off)
% 1 * imac server room xubuntu (turned off)
% 2 * pfsense router (6 port 8 core atom appliances)
% 1 * dell 48 port switch (1 turned off, 1 24 port switch reserve)
% 3 * 720 dell server (turned off)
% 2 * dell 16 port switch
% 2 * dell 8 port switch (1 turned off)
% 1 * raspberry pi farm
% 2 * office printer
% 4 * standby automatic lights
% 2 * tv + cable box (+ 1 turned off) (on ups)
% 2 * hue hub
% 1 * evohome + pump heating system
% 1 * airconditioner (idle blow, 28 degrees threshold)
% 1 * fitlet (serves hue and heating)
% 1 * fritzbox (7590) + 3 repeaters
% 1 * cable modem
% 3 * small UPS
% 3 * distributed backup (old macbook, hp laptop, hp micro server)
% - - some standby things (squeeze boxes etc)
% 32  hue light bulbs
% 6 * cordless phones
% 1 * alarm panel
% 2 * warm water boiler (standby + upping)
% 1 * coffee machine (standby + upping)
% 1 * freezer (standby + upping)
% 1 * refrigerator (standby + upping)
%
% 800-1000W (from 1750-2000)
%
% (upcoming new monitors will save 100W)
%
% aim: 750 during the day, 500 after midnight
%
% 4 solar panels on shed

% not mentioned: washing machine, dryer, dish washer, several audio sets,
% battery loaders (ebike etc),

\stopcomponent


